DROP TABLE DUAL_HIBERNATE_SEQUENCE IF EXISTS
DROP TABLE ROOMS IF EXISTS
DROP TABLE SEQUENCE IF EXISTS


CREATE MEMORY TABLE SEQUENCE(SEQ_NAME VARCHAR(50) NOT NULL PRIMARY KEY,SEQ_COUNT NUMERIC(38))
CREATE MEMORY TABLE ROOMS(ID INTEGER GENERATED BY DEFAULT AS IDENTITY(START WITH 1) NOT NULL PRIMARY KEY,NAME VARCHAR(255))
CREATE MEMORY TABLE DUAL_HIBERNATE_SEQUENCE(ZERO INTEGER)
INSERT INTO SEQUENCE VALUES('SEQ_GEN',0)



